1 1.1 1.2 1.3 1.4 )^2c

(GeV/ KK M 1

10

210

310

))^2c (mb/(GeV/ KK Md_{KK} y/dσ^2d

= 5.02 TeV NNs Pb UPC, − ALICE, Pb c < 0.1 GeV/

T, KK p | < 0.8,

KKy|

Data Best fit

system

-π^+π

| = 0 ϕA/_{KK} B| 100)

× (^-K^+ K → (1270) 2 f →γγ

ALI-PUB-574533

ALI-PUB-574533