0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2_{-1/2} )^2c

| (GeV/

A/B|

3− 2− 1− 0 1 2 3

(rad) φ phase angle

= 5.02 TeV NNs Pb UPC, − ALICE, Pb

Best fit

system

-π^+π = 1 best fit

/ndf 2χ /ndf - 2χ 68 % C.L.

= 4 best fit

/ndf 2χ /ndf - 2χ 95 % C.L.

ALI-PUB-574537

ALI-PUB-574537