(true) OS 0 0.2 0.4 0.6 0.8 1

(measured) OS

0

0.2

0.4

0.6

0.8

1

0

5000

10000

15000

20000

25000

= 7 TeV s ALICE Preliminary pp, < 81

tracklets SPD N 20 <

c > 0.15 GeV/ Tp | < 0.8 η, |^0

Events with D PYTHIA 6 (Perugia 2011)

MPV RMS] ± Mean [

ALI-PREL-140744

ALI-PREL-140744