Spherocity

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Efficiency

3-10

2-10

1-10

1 ALICE Preliminary = 7 TeV s pp,

(and charge conj.)

+π ^- K

→ ^0D

< 81

tracklets SPD N : 20 < 0 Prompt D

< 1 (Integrated) OS 0 < c < 4 GeV/ Tp 2 < c < 8 GeV/ Tp 4 < c < 12 GeV/ Tp 8 <

)_OS

Spherocity (

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

SpheroInt

/Eff

Sphero Eff

0.6 0.8 1 1.2 1.4

ALI-PREL-140728

ALI-PREL-140728