<0.5 η〉η/d_{ch}Nd〈 0 10 20 30 40 50 60 70

)c (GeV/

〉_Tp〈

0.75

0.8

0.85

0.9

0.95

1

1.05

1.1 = 8.16 TeV NNs Preliminary, p-Pb, = 5.02 TeV, Phys.Lett.B 728 (2014) 25-38 NNs p-Pb,

stat. syst. syst. uncorr.

< 0 y -0.5 <

ALICE

S 0K

ALI-PREL-508186

ALI-PREL-508186