1 10^210^310

0.5<|η|〉ηd/chNd〈

0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 / D + cΛ

ALICE | < 0.5y|

stat. syst. extr. total

= 13 TeV s pp, = 5.02 TeV s pp, = 5.02 TeV NNs Pb, −p = 5.02 TeV NNs Pb, −Pb = 200 GeV NNs Au, −Au STAR, PRL 124 (2020) 172301

SHMc Catania TAMU PYTHIA 8

ALI-PUB-561435

ALI-PUB-561435