0 10 20 -ln(JP)

1−10 1 10 210 310 410 510

Counts

Data Fit model b-jet template c-jet template uds-jet template

ALICE Preliminary

= 13 TeV s pp, c < 40 GeV/

T ch,Jet p 30 < Tk charged-particle jets, anti- | < 0.5 jetη

= 0.4, | R

B-tagged jets

ALI-PREL-507588

ALI-PREL-507588