1−10 1 10 (TeV) s

10

210

310 b)μ (_{=0y}y/d^{cc}σd

| < 0.5) y ALICE (pp, | < 0.04) y 0.96 < −,A Pb/ − ALICE (p | < 0.5) y PHENIX (pp, | | < 1.0) y STAR (pp, |

FONLL NNLO

ALI-PUB-589175

ALI-PUB-589175