0 2 4 6 8 10 )c (GeV/ Tp

1

2

3

4

5

6

Ratio of cross sections

ALICE preliminary

|<0.8 y e, |

→ c) →b( = 5.02 TeV s = 13 TeV / s pp, Data FONLL

2.6 % lumi. unc. not shown ±

ALI-PREL-503680

ALI-PREL-503680