(rad) φΔ 0 2 4

)^{-1} ) (rad φΔ B(

0

0.05

0.1

0.15

0.2

0-5% 40-60% 80-100%

= 5.02 TeV NNs p-Pb

ALICE Preliminary c 2 GeV/

≤ _Tp≤

0.2 1.6 ≤y| Δ| ±π

ALI-PREL-159060

ALI-PREL-159060