0.14 0.145 0.15 0.155 0.16 )^2c

) (GeV/ π(K M)-ππ(K M

0.002

0.004

0.006

0.008

0.010

0.012

0.014 610 ×

2c Counts per 0.33 MeV/

ALICE Preliminary = 13.6 TeV s pp, _{1−}

= 4 pb intL + c.c.

+π^+π^- K

→^+π^0 D

→^+D* c < 2.0 GeV/ Tp 1.5 <

Data

Signal

Comb. background

Total fit function

ALI-PREL-636420

ALI-PREL-636420