1−10

1

10

210

)c^{-1} b GeV μ) ( y d_Tp/(dσ^2d

= 13.6 TeV s = 13 TeV s

1.06% BR unc. not shown ±

ALICE Preliminary

| < 0.5 y pp, |_+ Prompt D*

2 4 6 8 10 12 14 16 )c (GeV/ Tp 0.6 0.8 1.0 1.2

13 TeV

13.6 TeV

ALI-PREL-636364

ALI-PREL-636364