0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 7−5 15−7 35−15

7−5 15−7 35−15

0.2 1 1 1 0.2

1

1

1 ]c [GeV/

ch jet Tp measured

chz measured chz true ]c [GeV/

ch jet Tp true probability

Simulation

ALICE ψ = 13 TeV, non-prompt J/ s pp

ALI-PUB-620625

ALI-PUB-620625