0 2 4 6 8 10 12 14 16 18 20 )c (GeV/ ψJ/ Tp 0

0.05

0.1

0.15

0.2

0.25 efficiency ψ = 13 TeV, Inclusive J/ s pp MB)ε× (Acc TRD ε Total

ALI-PUB-620621

ALI-PUB-620621