0.2 0.4 0.6 R Jet resolution parameter 0 2 4 6 8 10 12 14 16 18 20 22 24

)c Standard deviation (GeV/

R | < 0.9- jetη

= 0.4, |

R, _Tk

Ch-particle jets, anti-

= 5.02 TeV NNs Pb − 0-10% Pb

ALICE Performance, Embedded PYTHIA

c 40 GeV/ ≥ T, ch jet p 0-10% central

Area-based ML-based 30-50% central

area-based ML-based

ALI-PERF-503321

ALI-PERF-503321