)c (GeV/ Tp 0.3 1 2 3 4 5 67 10 20 30 40

purε/

conv

P⋅_{rec}ε⋅A

2−10

1−10

PCM PHOS EMC ALICE simulation = 5.02 TeV NNs NSD p-Pb,

ALI-PERF-147974

ALI-PERF-147974