0.3 0.35 0.4 0.45 0.5 0.55 )c (GeV/ p

0.85

0.9

0.95

1 purity ± single K

ALICE = 5.02 TeV NNs Pb −p

−K^−K⊕^+K^+K 20% −0 40% −20 90% −40

ALI-PUB-619055

ALI-PUB-619055