0.2 0.4 0.6 0.8 1 TS 0 0.005

0.01

0.015

0.02

0.025

0.03

)_TS(P

Sphericity mult (1-18) mult (18-30) mult > 30

18 ≤ _{trk} N 30 ≤ _{trk} N 18 <

> 30 trkN

= 13 TeV s ALICE pp

ALI-PUB-574721

ALI-PUB-574721