)c (GeV/ Tp 0 1 2 3 4 5 6 7 8

AA R

0

0.5

1

1.5

2

0-10%

60-90%

= 5.02 TeV NNs Pb-Pb _- μ^+μ→ϕ < 4 y 2.5 <

ALICE Preliminary

ALI-PREL-133356

ALI-PREL-133356