)c (GeV/ Tp 0 1 2 3 4 5 6 7 8 9

± / Background e ± Inclusive e

0 2 4 6 8 10 12 14 = 5.02 TeV NNs 30-50% Pb-Pb, | < 0.7 y|

ALICE Preliminary

ALI-PREL-126515

ALI-PREL-126515