)^2c

(GeV/ −μ^+μm 2 2.5 3 3.5 4 4.5 5

2c Counts per 25 MeV/

0

5

10

15

20 ALICE Preliminary 90% − = 5.02 TeV, 70 NNs Pb, −Pb , Helicity Frame −μ^+μ→ψJ/ c < 0.3 GeV/ Tp < 4.0 y 2.5 < | < 0.60 θ 0.50 < |cos Data Total fit Signal Background

ALI-PREL-546768

ALI-PREL-546768