Centrality (%)

0 10 20 30 40 50 60 70 80

ηΔσ

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

c < 2.0 GeV/

T assoc p, T trig p≤ 0.2 /2π<φΔ /2< π- | < 1.6 ηΔ| ALICE Preliminary

= 2.76 TeV NNs Pb-Pb, = 5.02 TeV NNs Pb-Pb,

Eur.Phys.J.C76(2016)86

ALI-PREL-159228

ALI-PREL-159228