)^2c

(GeV/ μμM 7 8 9 10 11 12 13

2v

0.3 − 0.2 − 0.1 − 0 0.1 0.2 0.3 0.4 0.5

Data Total fit Background fit

= 5.02 TeV NNs Pb−

ALICE Preliminary Pb 60% −5 < 4 y 2.5 < c < 15 GeV/ Tp 2 <

ALI-PREL-314837

ALI-PREL-314837