)^2c

(GeV/ eeM 0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5

-1)^2c

(GeV/ eeM /dNd

510

610

710 ALICE preliminary < 0.14 cmsy

1.06 < - = 5.02 TeV, NNs p-Pb,

Unlike-sign pairs Like-sign pairs

ALI-PREL-99460

ALI-PREL-99460