p/E 0.4 0.6 0.8 1 1.2 1.4 1.6

Counts

0 20 40 60 80 100 120 140 160 electron candidates hadrons

ALICE preliminary = 5.02 TeV NNs p-Pb, < 0.14 cmsy

1.06 < - c < 16 GeV/ Tp 14 <

> 11 GeV

cluster EMC E Trigger

ALI-PREL-99456

ALI-PREL-99456