2040 6080 100 2420 4060 1500 2000

dN_{ch}/dη_{lab}

-5-4-3-2-1012345

η_{lab}

ALICE

Data (symmetrised)

Reflected

Uncorr. syst. unc.

Corr. syst. unc. √ s_{NN} = 5.02 TeV

Pb–Pb, 0–5% p–Pb, 0–5% pp, INEL > 0

ALI-PUB-561280