1 2 3

4 5 6

7 8 9 10

) GeV/c ( gen. Tp

1− 0.8 −0.6

−0.4

−0.2 −0 0.2 0.4 0.6 0.8 1

gen.η

0

0.2

0.4

0.6

0.8

1

Efficiency

ALICE Simulation = 5.02 TeV, 30-50 % NNs Pb-Pb HIJING Simulation

ALI-SIMUL-516742

ALI-SIMUL-516742