x sign (charge x B field) (cm) 0d 0.2 - 0.15

- 0.1- 0.05- 0 0.05 0.1 0.15 0.2

Entries

1 10 210 310 410 510

Data Fit Norm. pull

Dalitz Conversion e →c e → c) →b ( c < 2.50 GeV/ Tp 2.25 <

| < 0.8 y = 5.02 TeV, | NNs 0-10% Pb-Pb,

ALICE Preliminary

ALI-PREL-147790

ALI-PREL-147790