)σ (_e>|x/dE

- <TPC d dx/E

TPC d

12− 10− 8− 6− 4− 2− 0 2 4

Entries

1 10 210 310 410 510 610 710 Data k,p_± π_± e Data/Fit

| < 0.8 y = 13 TeV, | s pp,

ALICE Preliminary c < 2.50 GeV/ p 2.30 < | < 3 TOF σ|n

ALI-PREL-133036

ALI-PREL-133036