)c (GeV/ Tp 0 2 4 6 8 10 12

{EP} 2v

0.1 −

0.05 −

0

0.05

0.1

0.15

0.2 = 5.02 TeV NNs ALICE Pb-Pb,

1% ± global syst :

< 4 y , 2.5 <

= 1.1} ηΔ {EP, 2v, ^−μ^+μ→ψ Inclusive J/ 5-20% 20-40% 40-60%

ALI-DER-139388

ALI-DER-139388