Counts

5000

10000

15000

(a)

ALICE_- μ^+μ→ψ Inclusive J/ c < 4 GeV/ Tp < 4, 2 < y 2.5 < _{-1} bμ 225

≈ _{int}L

Opposite-sign pairs Fit total Fit signal Fit background

)^2c

(GeV/ μμm 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4

〉)Ψ - φ cos 2( 〈

0

0.05

0.1 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8 4

Opposite-sign pairs

)_{μμ}m(_2v

Fit total

(b)

5000

10000

15000

(c)

= 5.02 TeV NNs 20 - 40% Pb-Pb _- e^+ e →ψ Inclusive J/ c < 6 GeV/ Tp | < 0.9, 2 < y| _{-1} bμ 13 ≈ _{int}L

Opposite-sign pairs Mixed event pairs MC signal shape

)^2c

(GeV/ eem 2.4 2.6 2.8 3 3.2 3.4 3.6

0

0.05

0.1

(d)

Opposite-sign pairs

)_{ee}m(_2v

Fit total

ALI-PUB-138829

ALI-PUB-138829