) ^2c

(GeV/ inv m 1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15 1.16

-1)^2c (GeV/ inv m/d N ) d evN (1/

0

10

20

30

40

50

60

70 ALICE Preliminary 20% − = 5.02 TeV, 10 NNs Pb, −Pb | < 0.5 Λη, |c < 1.4 GeV/

ΛT,p

1.3 <

background fit

interpolated bkg.

) ^2c

(GeV/ inv m 1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15 1.16

bkg w, _Λw

0 0.2 0.4 0.6 0.8 1 1.2 1.4 ALICE Preliminary 20% − = 5.02 TeV, 10 NNs Pb, −Pb | < 0.5 Λη, |c < 1.4 GeV/

ΛT,p

1.3 <

Λw bkg w

ALI-PREL-157709

ALI-PREL-157709