Centrality (%)

0 10 20 30 40 50 60 70 80

nC

0

10

20

30

40

50 ALICE Preliminary = 5.02 TeV NNs Pb, −Pb | < 0.5 Λη, |c < 4 GeV/

ΛT,p

1 <

)Λ(_1C )Λ(_1C )Λ(_2C )Λ(_2C

)Λ−Λ(_2C

Centrality (%)

0 10 20 30 40 50 60 70 80

(Skellam) 2 )/C Λ-Λ(_2C

0.9 0.95 1 1.05

ALI-PREL-157764

ALI-PREL-157764