(degrees) Vψ 0 20 40 60 80 100 120 140 160 180

Counts (arb. units)

310

410

510

610

γ 0π η

10% − = 2.76 TeV, 0 NNs Pb, − ALICE Simulation, Pb

< 0.8 eη,c

> 0.4 GeV/

T, e p

ALI-PUB-162143

ALI-PUB-162143