x / d Edσ e〉x / d Ed〈 - x / d Ed TPC

10− 5− 0 5 10 15 20

Counts

1−10 1 10 210 310 410 510 610 710 810 10% − = 2.76 TeV, 0 NNs Pb, − ALICE, Pb c < 0.6 GeV/ p 0.5 <

Data Total fit π e K p

ALI-PUB-162135

ALI-PUB-162135