)^2c

(GeV/ eem 0 0.5 1 1.5 2 2.5 3 3.5

)^2c Counts / (GeV/

210 310 410 510 610 710 810 910

Unlike-sign Like-sign ×R Signal

10% − = 2.76 TeV, 0 NNs Pb, − ALICE, Pb < 0.8 eη,c

> 0.4 GeV/

T, e p B = -0.5 T

ALI-PUB-162227

ALI-PUB-162227