)^2c

(GeV/ eem 0 0.5 1 1.5 2 2.5 3 3.5

-1)^2c

(GeV/ eemd Nd evtN 1

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210

Dielectron pairs + contamination Contamination (e-h + h-h)

10% − = 2.76 TeV, 0 NNs Pb, − ALICE Simulation, Pb < 0.8 eη,c

> 0.4 GeV/

T, e p

)^2c

(GeV/ eem 0 0.5 1 1.5 2 2.5 3 3.5

Ratio

0 0.005

0.01

0.015

0.02

ALI-PUB-162003

ALI-PUB-162003