(cm) R 0 5 10 15 20 25 30 35 40 45 50

Average fraction of ITS shared clusters

0 0.2 0.4 0.6 0.8 1 10% − = 2.76 TeV, 0 NNs Pb, − ALICE Simulation, Pb

ALI-PUB-162007

ALI-PUB-162007