)c (GeV/ Tp 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

)c Counts / (20 MeV/

0

100

200

300

400

500

600

Data Combinatorial BG (Pol4) Coherent STARlight MC Incoherent STARlight MC Total

/ndf = 51 / 47 2χ -π^+π^-π^+π

Pb + Pb + → ALICE, Pb + Pb | < 0.5 -π^+π^-π^+π y = 5.02 TeV, | NNs

ALI-PUB-618557

ALI-PUB-618557