0 10 20 30 40 50 60 70 80 90 100

(mb) y/dσ d× BR

ALICE KGTT single resonance (H1)

(1450) ρ ALICE

(1450) ρ KGTT

(1700) ρ ALICE

(1700) ρ KGTT

| < 0.5 -π^+π^-π^+πy

= 5.02 TeV, |

NNs, ^-π^+π^-π^+π

Pb + Pb + → ALICE, Pb + Pb

ALI-PUB-618573

ALI-PUB-618573