lab η 2.4 2.6 2.8 3 3.2 3.4 3.6 3.8

)_{lab}η/d_γN

) (d evt N (1/

5 10 15 20 25 30

ALICE NSD = 5.02 TeV NNs p,−Pb

< 3.9 labη

2.3 <

ALICE DPMJET HIJING AMPT

labη

2.4 2.6 2.8 3 3.2 3.4 3.6 3.8

MC/Data

0.8 0.9 1 1.1

ALI-PUB-562227

ALI-PUB-562227